France
Hot_Air_Balloon
934
426
55
896.948
0.117397
0
0
0
7.68897
20000
1
4.75534
5.24728
0
0
0
0
0
0.5
-0.2
2
911.165
438.522
807.057
436.184
1
Hot_Air_Balloon
1
445.804
14.9776
42.9824
-1.67
0
0.0176556
0.01
1
0
0
3
gull
gull
gull
